0.0 400. 800. 1200. 1600.

s (m)

PS2 NMC hybrid ring

0.0 7. 14. 21. 28. 35. 42. 49. 56. 63. 70.

βx (m), βy (m)

-10.0

-7.5

-5.0

-2.5 0.0 2.5 5.0 7.5 10.0

12.5

Dx (m)

β x β y Dx