0.0 400. 800. 1200. 1600.

s (m)

PS2 NMC with supressor ring

0.0 10. 20. 30. 40. 50. 60.

βx (m), βy (m)

-6. -4. -2. 0.0 2. 4. 6. 8. 10.

Dx (m)

Dx